Index: branches/5.0.x/core/install/install_data.sql
===================================================================
diff -u -r12205 -r12209
--- branches/5.0.x/core/install/install_data.sql	(.../install_data.sql)	(revision 12205)
+++ branches/5.0.x/core/install/install_data.sql	(.../install_data.sql)	(revision 12209)
@@ -107,7 +107,7 @@
 INSERT INTO ConfigurationAdmin VALUES ('MenuFrameWidth', 'la_section_SettingsAdmin', 'la_prompt_MenuFrameWidth', 'text', NULL, NULL, 40.06, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'MenuFrameWidth', 200, 'In-Portal', 'in-portal:configure_advanced');
 INSERT INTO ConfigurationAdmin VALUES ('ResizableFrames', 'la_section_SettingsAdmin', 'la_config_ResizableFrames', 'checkbox', '', '', 40.07, 0, 0);
-INSERT INTO ConfigurationValues VALUES (DEFAULT, 'ResizableFrames', '0', 'In-Portal', 'in-portal:configure_advanced');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'ResizableFrames', '1', 'In-Portal', 'in-portal:configure_advanced');
 INSERT INTO ConfigurationAdmin VALUES ('AutoRefreshIntervals', 'la_section_SettingsAdmin', 'la_config_AutoRefreshIntervals', 'text', '', '', 40.08, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AutoRefreshIntervals', '1,5,15,30,60,120,240', 'In-Portal', 'in-portal:configure_advanced');
 INSERT INTO ConfigurationAdmin VALUES ('DebugOnlyFormConfigurator', 'la_section_SettingsAdmin', 'la_config_DebugOnlyFormConfigurator', 'checkbox', '', '', 40.09, 0, 0);
