Index: branches/5.0.x/core/install/install_schema.sql
===================================================================
diff -u -N -r12877 -r12970
--- branches/5.0.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 12877)
+++ branches/5.0.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 12970)
@@ -250,14 +250,16 @@
   PwResetConfirm varchar(255) DEFAULT NULL,
   PwRequestTime int(11) unsigned DEFAULT NULL,
   MinPwResetDelay int(11) NOT NULL DEFAULT '1800',
+  AdminLanguage int(11) DEFAULT NULL,
   PRIMARY KEY (PortalUserId),
   UNIQUE KEY ResourceId (ResourceId),
   UNIQUE KEY Login (Login),
   KEY CreatedOn (CreatedOn),
   KEY `Status` (`Status`),
   KEY Modified (Modified),
   KEY dob (dob),
-  KEY IsBanned (IsBanned)
+  KEY IsBanned (IsBanned),
+  KEY AdminLanguage (AdminLanguage)
 );
 
 CREATE TABLE PortalUserCustomData (
