Index: branches/5.0.x/core/install/upgrades.sql
===================================================================
diff -u -r13339 -r13409
--- branches/5.0.x/core/install/upgrades.sql	(.../upgrades.sql)	(revision 13339)
+++ branches/5.0.x/core/install/upgrades.sql	(.../upgrades.sql)	(revision 13409)
@@ -1633,4 +1633,6 @@
 WHERE Phrase IN ('la_fld_Image', 'la_fld_Qty');
 
 # ===== v 5.0.3-B2 =====
-UPDATE CustomField SET ValueList = REPLACE(ValueList, '=+||', '') WHERE ElementType = 'radio';
\ No newline at end of file
+UPDATE CustomField SET ValueList = REPLACE(ValueList, '=+||', '') WHERE ElementType = 'radio';
+
+# ===== v 5.0.3-RC1 =====
\ No newline at end of file
