Index: branches/5.1.x/core/install/install_data.sql
===================================================================
diff -u -r13170 -r13180
--- branches/5.1.x/core/install/install_data.sql	(.../install_data.sql)	(revision 13170)
+++ branches/5.1.x/core/install/install_data.sql	(.../install_data.sql)	(revision 13180)
@@ -177,7 +177,7 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'CSVExportEncoding', '0', 'In-Portal', 'in-portal:configure_advanced');
 INSERT INTO ConfigurationAdmin VALUES ('MemcacheServers', 'la_section_SettingsCaching', 'la_config_MemcacheServers', 'text', '', '', 80.01, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'MemcacheServers', 'localhost:11211', 'In-Portal', 'in-portal:configure_advanced');
-INSERT INTO ConfigurationAdmin VALUES ('CacheHandler', 'la_section_SettingsCaching', 'la_config_CacheHandler', 'select', NULL, 'Fake=la_None,Memcache=+Memcached,Apc=+Alternative PHP Cache', 80.02, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('CacheHandler', 'la_section_SettingsCaching', 'la_config_CacheHandler', 'select', NULL, 'Fake=la_None,Memcache=+Memcached,Apc=+Alternative PHP Cache,XCache=+XCache', 80.02, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'CacheHandler', 'Fake', 'In-Portal', 'in-portal:configure_advanced');
 
 # Section "in-portal:configure_users":
