Index: branches/5.1.x/core/install/install_data.sql
===================================================================
diff -u -N -r13489 -r13492
--- branches/5.1.x/core/install/install_data.sql	(.../install_data.sql)	(revision 13489)
+++ branches/5.1.x/core/install/install_data.sql	(.../install_data.sql)	(revision 13492)
@@ -44,6 +44,7 @@
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'UseVisitorTracking', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_UseVisitorTracking', 'checkbox', '', '', 10.09, 0, 0, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'CookieSessions', '2', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSession', 'la_prompt_session_management', 'select', NULL, '0=lu_opt_QueryString||1=lu_opt_Cookies||2=lu_opt_AutoDetect', 20.01, 0, 1, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'SessionCookieName', 'sid', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSession', 'la_prompt_session_cookie_name', 'text', '', '', 20.02, 0, 1, NULL);
+INSERT INTO ConfigurationValues VALUES(DEFAULT, 'SessionCookieDomains', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSession', 'la_config_SessionCookieDomains', 'textarea', '', 'rows="5" cols="40"', 20.021, 0, 0, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'KeepSessionOnBrowserClose', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSession', 'la_config_KeepSessionOnBrowserClose', 'checkbox', '', '', 20.03, 0, 0, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'SessionBrowserSignatureCheck', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSession', 'la_config_SessionBrowserSignatureCheck', 'checkbox', NULL, NULL, 20.04, 0, 1, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'SessionIPAddressCheck', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSession', 'la_config_SessionIPAddressCheck', 'checkbox', NULL, NULL, 20.05, 0, 1, NULL);
