Index: branches/5.1.x/core/install/upgrades.sql
===================================================================
diff -u -r13613 -r13614
--- branches/5.1.x/core/install/upgrades.sql	(.../upgrades.sql)	(revision 13613)
+++ branches/5.1.x/core/install/upgrades.sql	(.../upgrades.sql)	(revision 13614)
@@ -1670,7 +1670,7 @@
 
 UPDATE Category SET FormId = NULL WHERE FormId = 0;
 
-INSERT INTO ConfigurationAdmin VALUES ('MemcacheServers', 'la_section_SettingsCaching', 'la_config_MemcacheServers', 'text', '', '', 80.01, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('MemcacheServers', 'la_section_SettingsCaching', 'la_config_MemcacheServers', 'text', '', '', 80.02, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'MemcacheServers', 'localhost:11211', 'In-Portal', 'in-portal:configure_advanced');
 
 ALTER TABLE Category
@@ -1702,7 +1702,7 @@
   KEY DomainId (DomainId)
 );
 
-INSERT INTO ConfigurationAdmin VALUES ('CacheHandler', 'la_section_SettingsCaching', 'la_config_CacheHandler', 'select', NULL, 'Fake=la_None,Memcache=+Memcached,Apc=+Alternative PHP Cache,XCache=+XCache', 80.02, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('CacheHandler', 'la_section_SettingsCaching', 'la_config_CacheHandler', 'select', NULL, 'Fake=la_None,Memcache=+Memcached,Apc=+Alternative PHP Cache,XCache=+XCache', 80.01, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'CacheHandler', 'Fake', 'In-Portal', 'in-portal:configure_advanced');
 
 ALTER TABLE ConfigurationValues
@@ -1823,6 +1823,7 @@
 	ADD HintLabel VARCHAR(255) NULL DEFAULT NULL,
 	ADD INDEX (HintLabel);
 
+UPDATE ConfigurationValues SET HintLabel = 'la_hint_MemcacheServers' WHERE VariableName = 'MemcacheServers';
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'ModRewriteUrlEnding', '.html', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_ModRewriteUrlEnding', 'select', '', '=+||/=+/||.html=+.html', 10.021, 0, 0, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'ForceModRewriteUrlEnding', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_ForceModRewriteUrlEnding', 'checkbox', '', NULL, 10.022, 0, 0, 'la_hint_ForceModRewriteUrlEnding');
 
