Index: branches/5.2.x/core/install/install_data.sql
===================================================================
diff -u -r14856 -r14879
--- branches/5.2.x/core/install/install_data.sql	(.../install_data.sql)	(revision 14856)
+++ branches/5.2.x/core/install/install_data.sql	(.../install_data.sql)	(revision 14879)
@@ -85,7 +85,7 @@
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'OutputCompressionLevel', '7', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_config_OutputCompressionLevel', 'text', '', '', 60.02, 0, 1, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'UseTemplateCompression', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_config_UseTemplateCompression', 'checkbox', '', '', 60.03, 0, 1, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'TrimRequiredFields', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_config_TrimRequiredFields', 'checkbox', '', '', 60.04, 0, 0, NULL);
-INSERT INTO ConfigurationValues VALUES(DEFAULT, 'UseCronForRegularEvent', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_UseCronForRegularEvent', 'checkbox', NULL, NULL, 60.05, 0, 0, NULL);
+INSERT INTO ConfigurationValues VALUES(DEFAULT, 'RunScheduledTasksFromCron', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_UseCronForRegularEvent', 'checkbox', NULL, NULL, 60.05, 0, 0, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'UseChangeLog', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_config_UseChangeLog', 'checkbox', '', '', 60.06, 0, 0, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'Backup_Path', '/home/alex/web/in-portal.rc/system/backupdata', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_config_backup_path', 'text', '', '', 60.07, 0, 1, NULL);
 INSERT INTO ConfigurationValues VALUES(DEFAULT, 'SystemTagCache', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSystem', 'la_prompt_syscache_enable', 'checkbox', NULL, NULL, 60.08, 0, 0, NULL);
@@ -564,10 +564,10 @@
 INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:service.view', 11, 1, 1, 0);
 INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:service.edit', 11, 1, 1, 0);
 
-INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:agents.delete', 11, 1, 1, 0);
-INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:agents.edit', 11, 1, 1, 0);
-INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:agents.add', 11, 1, 1, 0);
-INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:agents.view', 11, 1, 1, 0);
+INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:scheduled_tasks.delete', 11, 1, 1, 0);
+INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:scheduled_tasks.edit', 11, 1, 1, 0);
+INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:scheduled_tasks.add', 11, 1, 1, 0);
+INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:scheduled_tasks.view', 11, 1, 1, 0);
 
 INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:site_domains.delete', 11, 1, 1, 0);
 INSERT INTO Permissions VALUES (DEFAULT, 'in-portal:site_domains.edit', 11, 1, 1, 0);
