Index: branches/5.1.x/core/install/install_schema.sql
===================================================================
diff -u -r13824 -r13890
--- branches/5.1.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 13824)
+++ branches/5.1.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 13890)
@@ -264,6 +264,7 @@
   PwRequestTime int(11) unsigned DEFAULT NULL,
   MinPwResetDelay int(11) NOT NULL DEFAULT '1800',
   AdminLanguage int(11) DEFAULT NULL,
+  DisplayToPublic text,
   PRIMARY KEY (PortalUserId),
   UNIQUE KEY ResourceId (ResourceId),
   UNIQUE KEY Login (Login),
