Index: branches/5.2.x/core/install/install_schema.sql
===================================================================
diff -u -r14585 -r14605
--- branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 14585)
+++ branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 14605)
@@ -668,6 +668,7 @@
   LastRunStatus tinyint(3) unsigned NOT NULL default '1',
   NextRunOn int(11) default NULL,
   RunTime int(10) unsigned NOT NULL default '0',
+  SiteDomainLimitation varchar(255) NOT NULL,
   PRIMARY KEY  (AgentId),
   KEY Status (Status),
   KEY RunInterval (RunInterval),
@@ -676,7 +677,8 @@
   KEY LastRunOn (LastRunOn),
   KEY LastRunStatus (LastRunStatus),
   KEY RunTime (RunTime),
-  KEY NextRunOn (NextRunOn)
+  KEY NextRunOn (NextRunOn),
+  KEY SiteDomainLimitation (SiteDomainLimitation)
 );
 
 CREATE TABLE SpellingDictionary (
