Index: branches/5.2.x/core/install/install_schema.sql
===================================================================
diff -u -N -r14605 -r14614
--- branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 14605)
+++ branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 14614)
@@ -1027,6 +1027,8 @@
   DisplayInGrid tinyint(1) NOT NULL DEFAULT '1',
   DefaultValue text,
   Validation tinyint(4) NOT NULL DEFAULT '0',
+  UploadExtensions varchar(255) NOT NULL DEFAULT '',
+  UploadMaxSize int(11) DEFAULT NULL,
   Visibility tinyint(4) NOT NULL DEFAULT '1',
   EmailCommunicationRole tinyint(4) NOT NULL DEFAULT '0',
   PRIMARY KEY (FormFieldId),
@@ -1106,6 +1108,7 @@
   Description text,
   RequireLogin tinyint(4) NOT NULL DEFAULT '0',
   UseSecurityImage tinyint(4) NOT NULL DEFAULT '0',
+  SubmitNotifyEmail varchar(255) NOT NULL DEFAULT '',
   EnableEmailCommunication tinyint(4) NOT NULL DEFAULT '0',
   ProcessUnmatchedEmails tinyint(4) NOT NULL DEFAULT '0',
   ReplyFromName varchar(255) NOT NULL DEFAULT '',
