Index: branches/5.2.x/core/install/install_schema.sql
===================================================================
diff -u -r14662 -r14670
--- branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 14662)
+++ branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 14670)
@@ -673,6 +673,8 @@
   LastRunStatus tinyint(3) unsigned NOT NULL default '1',
   NextRunOn int(11) default NULL,
   RunTime int(10) unsigned NOT NULL default '0',
+  Timeout int(10) UNSIGNED NULL,
+  LastTimeoutOn int(10) unsigned default NULL,
   SiteDomainLimitation varchar(255) NOT NULL,
   PRIMARY KEY  (AgentId),
   KEY Status (Status),
@@ -683,6 +685,7 @@
   KEY LastRunStatus (LastRunStatus),
   KEY RunTime (RunTime),
   KEY NextRunOn (NextRunOn),
+  KEY Timeout (Timeout),
   KEY SiteDomainLimitation (SiteDomainLimitation)
 );
 
