Index: branches/5.2.x/core/install/install_data.sql
===================================================================
diff -u -r15434 -r15437
--- branches/5.2.x/core/install/install_data.sql	(.../install_data.sql)	(revision 15434)
+++ branches/5.2.x/core/install/install_data.sql	(.../install_data.sql)	(revision 15437)
@@ -25,7 +25,8 @@
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Config_Site_Time', '', 'In-Portal', 'in-portal:configure_general', 'la_Text_Date_Time_Settings', 'la_config_site_zone', 'select', '', NULL, 20.02, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'DefaultEmailSender', 'portal@user.domain.name', 'In-Portal', 'in-portal:configure_general', 'la_section_SettingsMailling', 'la_prompt_AdminMailFrom', 'text', NULL, 'size="40"', 30.01, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'SessionTimeout', '3600', 'In-Portal', 'in-portal:configure_general', 'la_section_SettingsSession', 'la_prompt_session_timeout', 'text', 'a:3:{s:4:"type";s:3:"int";s:13:"min_value_inc";i:1;s:8:"required";i:1;}', '', 40.01, 0, 1, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'AdminConsoleInterface', 'simple', 'In-Portal', 'in-portal:configure_general', 'la_section_SettingsAdmin', 'la_config_AdminConsoleInterface', 'select', '', 'simple=+simple||advanced=+advanced||custom=+custom', 50.01, 0, 1, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'AdminConsoleInterface', 'simple', 'In-Portal', 'in-portal:configure_general', 'la_section_SettingsAdmin', 'la_config_AdminConsoleInterface', 'select', '', 'simple=+simple||advanced=+advanced||custom=+custom', 50.01, 1, 1, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'AllowAdminConsoleInterfaceChange', '1', 'In-Portal', 'in-portal:configure_general', 'la_section_SettingsAdmin', 'la_config_AdminConsoleInterface', 'checkbox', NULL, NULL, 50.01, 2, 0, NULL);
 
 # Section "in-portal:configure_advanced":
 INSERT INTO SystemSettings VALUES(DEFAULT, 'PageHitCounter', '0', 'In-Portal', 'in-portal:configure_advanced', '', '', '', NULL, NULL, 0, 0, 0, NULL);
@@ -60,25 +61,24 @@
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Force_HTTP_When_SSL_Not_Required', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSSL', 'la_config_force_http', 'checkbox', '', '', 30.04, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'UseModRewriteWithSSL', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSSL', 'la_config_use_modrewrite_with_ssl', 'checkbox', '', '', 30.06, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'RootPass', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_prompt_root_pass', 'password', NULL, NULL, 40.01, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'AllowAdminConsoleInterfaceChange', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_AllowAdminConsoleInterfaceChange', 'checkbox', NULL, NULL, 40.02, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UseToolbarLabels', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseToolbarLabels', 'checkbox', NULL, NULL, 40.03, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UseSmallHeader', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseSmallHeader', 'checkbox', '', '', 40.04, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UseColumnFreezer', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseColumnFreezer', 'checkbox', '', '', 40.05, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UsePopups', '2', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UsePopups', 'select', '', '0=la_opt_SameWindow||1=la_opt_PopupWindow||2=la_opt_ModalWindow', 40.06, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'StickyGridSelection', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_StickyGridSelection', 'radio', '', '1=la_Yes||0=la_No', 40.07, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UseDoubleSorting', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseDoubleSorting', 'radio', '', '1=la_Yes||0=la_No', 40.08, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'MenuFrameWidth', '200', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_prompt_MenuFrameWidth', 'text', NULL, NULL, 40.09, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'ResizableFrames', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_ResizableFrames', 'checkbox', '', '', 40.10, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'AutoRefreshIntervals', '1,5,15,30,60,120,240', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_AutoRefreshIntervals', 'text', '', '', 40.11, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'DefaultGridPerPage', '20', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_DefaultGridPerPage', 'select', '', '10=+10||20=+20||50=+50||100=+100||500=+500', 40.12, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'DebugOnlyFormConfigurator', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_DebugOnlyFormConfigurator', 'checkbox', '', '', 40.13, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'DebugOnlyPromoBlockGroupConfigurator', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_DebugOnlyPromoBlockGroupConfigurator', 'checkbox', '', '', 40.14, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'RememberLastAdminTemplate', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_RememberLastAdminTemplate', 'checkbox', '', '', 40.15, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UseHTTPAuth', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseHTTPAuth', 'checkbox', '', '', 40.16, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'HTTPAuthUsername', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_HTTPAuthUsername', 'text', '', '', 40.17, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'HTTPAuthPassword', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_HTTPAuthPassword', 'password', NULL, NULL, 40.18, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'HTTPAuthBypassIPs', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_HTTPAuthBypassIPs', 'text', '', '', 40.19, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'EnablePageContentRevisionControl', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_EnablePageContentRevisionControl', 'checkbox', '', '', 40.20, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UseToolbarLabels', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseToolbarLabels', 'checkbox', NULL, NULL, 40.02, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UseSmallHeader', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseSmallHeader', 'checkbox', '', '', 40.03, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UseColumnFreezer', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseColumnFreezer', 'checkbox', '', '', 40.04, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UsePopups', '2', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UsePopups', 'select', '', '0=la_opt_SameWindow||1=la_opt_PopupWindow||2=la_opt_ModalWindow', 40.05, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'StickyGridSelection', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_StickyGridSelection', 'radio', '', '1=la_Yes||0=la_No', 40.06, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UseDoubleSorting', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseDoubleSorting', 'radio', '', '1=la_Yes||0=la_No', 40.07, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'MenuFrameWidth', '200', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_prompt_MenuFrameWidth', 'text', NULL, NULL, 40.08, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'ResizableFrames', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_ResizableFrames', 'checkbox', '', '', 40.09, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'AutoRefreshIntervals', '1,5,15,30,60,120,240', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_AutoRefreshIntervals', 'text', '', '', 40.10, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'DefaultGridPerPage', '20', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_DefaultGridPerPage', 'select', '', '10=+10||20=+20||50=+50||100=+100||500=+500', 40.11, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'DebugOnlyFormConfigurator', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_DebugOnlyFormConfigurator', 'checkbox', '', '', 40.12, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'DebugOnlyPromoBlockGroupConfigurator', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_DebugOnlyPromoBlockGroupConfigurator', 'checkbox', '', '', 40.13, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'RememberLastAdminTemplate', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_RememberLastAdminTemplate', 'checkbox', '', '', 40.14, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UseHTTPAuth', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseHTTPAuth', 'checkbox', '', '', 40.15, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'HTTPAuthUsername', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_HTTPAuthUsername', 'text', '', '', 40.16, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'HTTPAuthPassword', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_HTTPAuthPassword', 'password', NULL, NULL, 40.17, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'HTTPAuthBypassIPs', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_HTTPAuthBypassIPs', 'text', '', '', 40.18, 0, 0, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'EnablePageContentRevisionControl', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_EnablePageContentRevisionControl', 'checkbox', '', '', 40.19, 0, 0, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Smtp_Server', NULL, 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsMailling', 'la_prompt_mailserver', 'text', NULL, NULL, 50.01, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Smtp_Port', NULL, 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsMailling', 'la_prompt_mailport', 'text', NULL, NULL, 50.02, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Smtp_Authenticate', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsMailling', 'la_prompt_mailauthenticate', 'checkbox', NULL, NULL, 50.03, 0, 1, NULL);
