Index: branches/5.3.x/core/install/install_data.sql
===================================================================
diff -u -N -r15956 -r15976
--- branches/5.3.x/core/install/install_data.sql	(.../install_data.sql)	(revision 15956)
+++ branches/5.3.x/core/install/install_data.sql	(.../install_data.sql)	(revision 15976)
@@ -31,7 +31,7 @@
 
 # Section "in-portal:configure_advanced":
 INSERT INTO SystemSettings VALUES(DEFAULT, 'PageHitCounter', '0', 'In-Portal', 'in-portal:configure_advanced', '', '', '', NULL, NULL, 0, 0, 0, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UseModRewrite', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_use_modrewrite', 'checkbox', '', '', 10.01, 0, 1, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UseModRewrite', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_use_modrewrite', 'checkbox', '', '', 10.01, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'ModRewriteUrlEnding', '.html', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_ModRewriteUrlEnding', 'select', '', '=+||/=+/||.html=+.html', 10.011, 0, 0, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'ForceCanonicalUrls', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_ForceCanonicalUrls', 'checkbox', '', '', 10.0125, 0, 0, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'ForceModRewriteUrlEnding', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsWebsite', 'la_config_ForceModRewriteUrlEnding', 'checkbox', '', NULL, 10.012, 0, 0, 'hint:la_config_ForceModRewriteUrlEnding');
@@ -61,7 +61,7 @@
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Require_SSL', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSSL', 'la_config_require_ssl', 'checkbox', '', '', 30.03, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Require_AdminSSL', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSSL', 'la_config_RequireSSLAdmin', 'checkbox', '', '', 30.04, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'Force_HTTP_When_SSL_Not_Required', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSSL', 'la_config_force_http', 'checkbox', '', '', 30.05, 0, 1, NULL);
-INSERT INTO SystemSettings VALUES(DEFAULT, 'UseModRewriteWithSSL', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSSL', 'la_config_use_modrewrite_with_ssl', 'checkbox', '', '', 30.06, 0, 1, NULL);
+INSERT INTO SystemSettings VALUES(DEFAULT, 'UseModRewriteWithSSL', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsSSL', 'la_config_use_modrewrite_with_ssl', 'checkbox', '', '', 30.06, 0, 1, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'RootPass', '', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_prompt_root_pass', 'password', NULL, NULL, 40.01, 0, 0, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'UseToolbarLabels', '1', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseToolbarLabels', 'checkbox', NULL, NULL, 40.02, 0, 0, NULL);
 INSERT INTO SystemSettings VALUES(DEFAULT, 'UseSmallHeader', '0', 'In-Portal', 'in-portal:configure_advanced', 'la_section_SettingsAdmin', 'la_config_UseSmallHeader', 'checkbox', '', '', 40.03, 0, 0, NULL);
