Index: branches/5.3.x/core/install/install_schema.sql
===================================================================
diff -u -r15483 -r15574
--- branches/5.3.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 15483)
+++ branches/5.3.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 15574)
@@ -350,6 +350,7 @@
   StylesheetId int(10) unsigned NOT NULL DEFAULT '0',
   LanguagePackInstalled tinyint(3) unsigned NOT NULL DEFAULT '0',
   TemplateAliases text,
+  ImageResizeRules text,
   PRIMARY KEY (ThemeId),
   KEY Enabled (Enabled),
   KEY StylesheetId (StylesheetId),
@@ -729,6 +730,7 @@
   Timeout int(10) unsigned DEFAULT NULL,
   LastTimeoutOn int(10) unsigned DEFAULT NULL,
   SiteDomainLimitation varchar(255) NOT NULL DEFAULT '',
+  Settings text,
   PRIMARY KEY (ScheduledTaskId),
   KEY `Status` (`Status`),
   KEY LastRunOn (LastRunOn),
