Index: branches/5.3.x/core/install/install_schema.sql
===================================================================
diff -u -r15944 -r15945
--- branches/5.3.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 15944)
+++ branches/5.3.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 15945)
@@ -782,6 +782,7 @@
   LastTimeoutOn int(10) unsigned DEFAULT NULL,
   SiteDomainLimitation varchar(255) NOT NULL DEFAULT '',
   Settings text,
+  Module varchar(30) NOT NULL DEFAULT 'Core',
   PRIMARY KEY (ScheduledTaskId),
   KEY `Status` (`Status`),
   KEY LastRunOn (LastRunOn),
