Index: branches/5.3.x/core/install/upgrades.sql
===================================================================
diff -u -N -r16111 -r16124
--- branches/5.3.x/core/install/upgrades.sql	(.../upgrades.sql)	(revision 16111)
+++ branches/5.3.x/core/install/upgrades.sql	(.../upgrades.sql)	(revision 16124)
@@ -2910,6 +2910,22 @@
 
 # ===== v 5.2.1 =====
 
+# ===== v 5.2.2-B1 =====
+UPDATE LanguageLabels
+SET l1_Translation = 'Incorrect data format, please use {type}'
+WHERE PhraseKey = 'LA_ERR_BAD_TYPE';
+
+UPDATE LanguageLabels
+SET l1_Translation = 'Field value is out of range, possible values from {min_value} to {max_value}'
+WHERE PhraseKey = 'LA_ERR_VALUE_OUT_OF_RANGE';
+
+UPDATE LanguageLabels
+SET l1_Translation = 'Field value length is out of range, possible value length from {min_length} to {max_length}'
+WHERE PhraseKey = 'LA_ERR_LENGTH_OUT_OF_RANGE';
+
+ALTER TABLE Themes ADD StylesheetFile VARCHAR( 255 ) NOT NULL DEFAULT '';
+UPDATE Themes SET StylesheetFile = 'platform/inc/styles.css' WHERE `Name` = 'advanced';
+
 # ===== v 5.3.0-B1 =====
 ALTER TABLE ScheduledTasks ADD Settings TEXT NULL;
 ALTER TABLE Themes ADD ImageResizeRules TEXT NULL;
@@ -3005,4 +3021,4 @@
 ALTER TABLE SiteDomains
 	CHANGE SSLUrl SSLDomainName VARCHAR(255) NOT NULL DEFAULT '',
 	CHANGE SSLUrlUsesRegExp SSLDomainNameUsesRegExp TINYINT(4) NOT NULL DEFAULT '0';
-DELETE FROM UserPersistentSessionData WHERE VariableName = 'site-domain[Default]columns_.';
+DELETE FROM UserPersistentSessionData WHERE VariableName = 'site-domain[Default]columns_.';
\ No newline at end of file
