Index: branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql
===================================================================
diff -u -r10201 -r10206
--- branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql	(.../inportal_upgrade_v4.3.0.sql)	(revision 10201)
+++ branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql	(.../inportal_upgrade_v4.3.0.sql)	(revision 10206)
@@ -17,5 +17,7 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageWidth', 450, 'In-Portal:Users', 'in-portal:configure_users');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageHeight', 450, 'In-Portal:Users', 'in-portal:configure_users');
 
+INSERT INTO Counters VALUES (DEFAULT, 'members_count', 'SELECT COUNT(*) FROM <%PREFIX%>PortalUser WHERE Status = 1', NULL , NULL , '3600', '0', '|PortalUser|');
+
 UPDATE Modules SET Version = '4.2.3' WHERE Name = 'Core';
 UPDATE Modules SET Version = '4.3.0' WHERE Name = 'In-Portal';
\ No newline at end of file
