Index: branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql
===================================================================
diff -u -r10301 -r10315
--- branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql	(.../inportal_upgrade_v4.3.0.sql)	(revision 10301)
+++ branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql	(.../inportal_upgrade_v4.3.0.sql)	(revision 10315)
@@ -16,7 +16,7 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_ThumbnailImageWidth', 120, 'In-Portal:Users', 'in-portal:configure_users');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_ThumbnailImageHeight', 120, 'In-Portal:Users', 'in-portal:configure_users');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageWidth', 450, 'In-Portal:Users', 'in-portal:configure_users');
-
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageHeight', 450, 'In-Portal:Users', 'in-portal:configure_users');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UsePageHitCounter', 0, 'In-Portal', 'in-portal:configure_general');
 
 INSERT INTO Counters VALUES (DEFAULT, 'members_count', 'SELECT COUNT(*) FROM <%PREFIX%>PortalUser WHERE Status = 1', NULL , NULL , '3600', '0', '|PortalUser|');
