Index: branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql
===================================================================
diff -u -r10338 -r10358
--- branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql	(.../inportal_upgrade_v4.3.0.sql)	(revision 10338)
+++ branches/RC/admin/install/upgrades/inportal_upgrade_v4.3.0.sql	(.../inportal_upgrade_v4.3.0.sql)	(revision 10358)
@@ -67,5 +67,8 @@
 INSERT INTO ConfigurationAdmin VALUES ('UseChangeLog', 'la_Text_Website', 'la_config_UseChangeLog', 'checkbox', '', '', 10.25, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UseChangeLog', '0', 'In-Portal', 'in-portal:configure_general');
 
+INSERT INTO ConfigurationAdmin VALUES ('AutoRefreshIntervals', 'la_Text_Website', 'la_config_AutoRefreshIntervals', 'text', '', '', 10.26, 0, 0);
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AutoRefreshIntervals', '1,5,15,30,60,120,240', 'In-Portal', 'in-portal:configure_general');
+
 UPDATE Modules SET Version = '4.2.3' WHERE Name = 'Core';
 UPDATE Modules SET Version = '4.3.0' WHERE Name = 'In-Portal';
\ No newline at end of file
