Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -N -r10021 -r10156
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10021)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10156)
@@ -71,8 +71,12 @@
 INSERT INTO ConfigurationAdmin VALUES ('CSVExportEnclosure', 'la_Text_CSV_Export', 'la_config_CSVExportEnclosure', 'radio', NULL, '0=la_Doublequotes,1=la_Quotes', 40.2, 0, 1);
 INSERT INTO ConfigurationAdmin VALUES ('CSVExportSeparator', 'la_Text_CSV_Export', 'la_config_CSVExportSeparator', 'radio', NULL, '0=la_Linux,1=la_Windows', 40.3, 0, 1);
 INSERT INTO ConfigurationAdmin VALUES ('CSVExportEncoding', 'la_Text_CSV_Export', 'la_config_CSVExportEncoding', 'radio', NULL, '0=la_Unicode,1=la_Regular', 40.4, 0, 1);
+INSERT INTO ConfigurationAdmin VALUES ('u_MaxImageCount', 'la_section_ImageSettings', 'la_config_MaxImageCount', 'text', '', '', 30.01, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_ThumbnailImageWidth', 'la_section_ImageSettings', 'la_config_ThumbnailImageWidth', 'text', '', '', 30.02, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_ThumbnailImageHeight', 'la_section_ImageSettings', 'la_config_ThumbnailImageHeight', 'text', '', '', 30.03, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_FullImageWidth', 'la_section_ImageSettings', 'la_config_FullImageWidth', 'text', '', '', 30.04, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_FullImageHeight', 'la_section_ImageSettings', 'la_config_FullImageHeight', 'text', '', '', 30.05, 0, 0);
 
-
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Columns_Category', '2', 'In-Portal', 'Categories');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'DomainSelect','1','In-Portal','in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Site_Path', '/', 'In-Portal', 'in-portal:configure_general');
@@ -216,6 +220,11 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'CSVExportEnclosure', '0', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'CSVExportSeparator', '0', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'CSVExportEncoding', '0', 'In-Portal', 'in-portal:configure_general');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_MaxImageCount', 5, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_ThumbnailImageWidth', 120, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_ThumbnailImageHeight', 120, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageWidth', 450, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageHeight', 450, 'In-Portal:Users', 'in-portal:configure_users');
 
 INSERT INTO Events VALUES (DEFAULT, 'USER.ADD', NULL, 1, 0, 'In-Portal:Users', 'la_event_user.add', 0);
 INSERT INTO Events VALUES (DEFAULT, 'USER.ADD', NULL, 2, 0, 'In-Portal:Users', 'la_event_user.add', 1);
