Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -r10156 -r10301
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10156)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10301)
@@ -77,6 +77,7 @@
 INSERT INTO ConfigurationAdmin VALUES ('u_FullImageWidth', 'la_section_ImageSettings', 'la_config_FullImageWidth', 'text', '', '', 30.04, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('u_FullImageHeight', 'la_section_ImageSettings', 'la_config_FullImageHeight', 'text', '', '', 30.05, 0, 0);
 
+
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Columns_Category', '2', 'In-Portal', 'Categories');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'DomainSelect','1','In-Portal','in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Site_Path', '/', 'In-Portal', 'in-portal:configure_general');
@@ -625,3 +626,6 @@
 INSERT INTO ConfigurationAdmin VALUES ('KeepSessionOnBrowserClose', 'la_title_General', 'la_prompt_KeepSessionOnBrowserClose', 'checkbox', NULL, NULL, '13', '0', '0');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'KeepSessionOnBrowserClose', 0, 'Proj-Base', 'in-portal:configure_general');
 
+INSERT INTO ConfigurationAdmin VALUES ('UsePageHitCounter', 'la_Text_Website', 'la_config_UsePageHitCounter', 'checkbox', '', '', 10.24, 0, 0);
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UsePageHitCounter', 0, 'In-Portal', 'in-portal:configure_general');
+
