Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -N -r10415 -r10447
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10415)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10447)
@@ -81,6 +81,7 @@
 INSERT INTO ConfigurationAdmin VALUES ('UsePageHitCounter', 'la_Text_Website', 'la_config_UsePageHitCounter', 'checkbox', '', '', 10.24, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('UseChangeLog', 'la_Text_Website', 'la_config_UseChangeLog', 'checkbox', '', '', 10.25, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('AutoRefreshIntervals', 'la_Text_Website', 'la_config_AutoRefreshIntervals', 'text', '', '', 10.26, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('RememberLastPageForAdminUsers', 'la_Text_General', 'la_prompt_remember_last_page_for_admin_users', 'checkbox', '', '', 11, 0, 0);
 
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Columns_Category', '2', 'In-Portal', 'Categories');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'DomainSelect','1','In-Portal','in-portal:configure_general');
@@ -236,6 +237,7 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'PageHitCounter', 0, 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UseChangeLog', '0', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AutoRefreshIntervals', '1,5,15,30,60,120,240', 'In-Portal', 'in-portal:configure_general');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'RememberLastPageForAdminUsers', '', 'In-Portal:Users', 'in-portal:configure_users');
 
 INSERT INTO Events VALUES (DEFAULT, 'USER.ADD', NULL, 1, 0, 'In-Portal:Users', 'la_event_user.add', 0);
 INSERT INTO Events VALUES (DEFAULT, 'USER.ADD', NULL, 2, 0, 'In-Portal:Users', 'la_event_user.add', 1);
