Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -r10887 -r10906
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10887)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10906)
@@ -62,6 +62,7 @@
 INSERT INTO ConfigurationAdmin VALUES ('UseJSRedirect', 'la_Text_Website', 'la_config_use_js_redirect', 'checkbox', '', '', 10.14, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('MaxImportCategoryLevels', 'la_Text_General', 'la_prompt_max_import_category_levels', 'text', '', '', 10.08, 0, 1);
 INSERT INTO ConfigurationAdmin VALUES ('UseCronForRegularEvent', 'la_Text_Website', 'la_UseCronForRegularEvent', 'checkbox', NULL, NULL, 10.15, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('FilenameSpecialCharReplacement', 'la_Text_General', 'la_config_FilenameSpecialCharReplacement', 'select', NULL, '_=+_,-=+-', 10.16, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('NoPermissionTemplate', 'la_Text_Website', 'la_config_nopermission_template', 'text', '', '', 10.17, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('UseOutputCompression', 'la_Text_Website', 'la_config_UseOutputCompression', 'checkbox', '', '', 10.18, 0, 1);
 INSERT INTO ConfigurationAdmin VALUES ('OutputCompressionLevel', 'la_Text_Website', 'la_config_OutputCompressionLevel', 'text', '', '', 10.19, 0, 1);
@@ -220,6 +221,7 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UseJSRedirect', '0', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'MaxImportCategoryLevels', '10', 'In-Portal', 'in-portal:configure_categories');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UseCronForRegularEvent', '0', 'In-Portal', 'in-portal:configure_general');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'FilenameSpecialCharReplacement', '_', 'In-Portal', 'in-portal:configure_categories');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'NoPermissionTemplate', 'no_permission', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UseOutputCompression', '0', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'OutputCompressionLevel', '7', 'In-Portal', 'in-portal:configure_general');
