Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -N -r11121 -r11168
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11121)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11168)
@@ -1089,4 +1089,5 @@
 INSERT INTO Counters VALUES (DEFAULT, 'guests_online', 'SELECT COUNT(*) FROM <%PREFIX%>UserSession WHERE PortalUserId <= 0', NULL , NULL , '3600', '0', '|UserSession|');
 INSERT INTO Counters VALUES (DEFAULT, 'users_online', 'SELECT COUNT(*) FROM <%PREFIX%>UserSession', NULL , NULL , '3600', '0', '|UserSession|');
 
-INSERT INTO Modules VALUES ('Core', 'core/', 'adm', DEFAULT, 1, 1, '', 0, '0');
\ No newline at end of file
+INSERT INTO Modules VALUES ('Core', 'core/', 'adm', DEFAULT, 1, 1, '', 0, '0');
+INSERT INTO Modules VALUES ('In-Portal', 'core/', 'm', '4.3.9', 1, 0, '', 0, '0');
\ No newline at end of file
