Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -r11168 -r11172
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11168)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11172)
@@ -1089,5 +1089,9 @@
 INSERT INTO Counters VALUES (DEFAULT, 'guests_online', 'SELECT COUNT(*) FROM <%PREFIX%>UserSession WHERE PortalUserId <= 0', NULL , NULL , '3600', '0', '|UserSession|');
 INSERT INTO Counters VALUES (DEFAULT, 'users_online', 'SELECT COUNT(*) FROM <%PREFIX%>UserSession', NULL , NULL , '3600', '0', '|UserSession|');
 
+
+INSERT INTO ConfigurationAdmin VALUES ('AdvancedUserManagementInportal', 'la_Text_General', 'la_prompt_AdvancedUserManagementInportal', 'checkbox', NULL, NULL, '10.011', 0, 1);
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AdvancedUserManagementInportal', 0, 'In-Portal:Users', 'in-portal:configure_users');
+
 INSERT INTO Modules VALUES ('Core', 'core/', 'adm', DEFAULT, 1, 1, '', 0, '0');
 INSERT INTO Modules VALUES ('In-Portal', 'core/', 'm', '4.3.9', 1, 0, '', 0, '0');
\ No newline at end of file
