Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -N -r11176 -r11177
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11176)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11177)
@@ -42,7 +42,7 @@
 INSERT INTO ConfigurationAdmin VALUES ('SessionTimeout', 'la_Text_Website', 'la_prompt_session_timeout', 'text', '', '', 10.05, 0, 1);
 INSERT INTO ConfigurationAdmin VALUES ('SystemTagCache', 'la_Text_Website', 'la_prompt_syscache_enable', 'checkbox', NULL, NULL, 10.07, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('User_SubscriberGroup', 'la_Text_General', 'la_users_subscriber_group', 'select', NULL, '0=lu_none,<SQL+>SELECT GroupId as OptionValue, Name as OptionName FROM <PREFIX>PortalGroup WHERE Enabled=1 AND Personal=0</SQL>', 10.11, 0, 1);
-INSERT INTO ConfigurationAdmin VALUES ('AdvancedUserManagementInportal', 'la_Text_General', 'la_prompt_AdvancedUserManagementInportal', 'checkbox', NULL, NULL, '10.011', 0, 1);
+INSERT INTO ConfigurationAdmin VALUES ('AdvancedUserManagement', 'la_Text_General', 'la_prompt_AdvancedUserManagement', 'checkbox', NULL, NULL, '10.011', 0, 1);
 INSERT INTO ConfigurationAdmin VALUES ('Root_Name', 'la_Text_General', 'la_prompt_root_name', 'text', '', '', 10.07, 0, 1);
 INSERT INTO ConfigurationAdmin VALUES ('SocketBlockingMode', 'la_Text_Website', 'la_prompt_socket_blocking_mode', 'checkbox', NULL, NULL, 10.08, 0, 0);
 INSERT INTO ConfigurationAdmin VALUES ('Min_UserName', 'la_Text_General', 'la_text_min_username', 'text', '', '', 10.03, 0, 0);
@@ -177,7 +177,7 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'SystemTagCache', '0', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Root_Name', 'lu_rootcategory_name', 'In-Portal', 'in-portal:configure_categories');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'User_SubscriberGroup', '12', 'In-Portal:Users', 'in-portal:configure_users');
-INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AdvancedUserManagementInportal', 0, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AdvancedUserManagement', 0, 'In-Portal:Users', 'in-portal:configure_users');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'SocketBlockingMode', '0', 'In-Portal', 'in-portal:configure_general');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Min_UserName', '3', 'In-Portal:Users', 'in-portal:configure_users');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'Min_Password', '5', 'In-Portal:Users', 'in-portal:configure_users');
