Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -r11396 -r11409
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11396)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 11409)
@@ -1102,5 +1102,8 @@
 INSERT INTO ConfigurationAdmin VALUES ('CheckStopWords', 'la_Text_Website', 'la_config_CheckStopWords', 'checkbox', '', '', 10.29, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'CheckStopWords', '0', 'In-Portal', 'in-portal:configure_general');
 
+INSERT INTO ConfigurationAdmin VALUES ('ResizableFrames', 'la_Text_Website', 'la_config_ResizableFrames', 'checkbox', '', '', 10.30, 0, 0);
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'ResizableFrames', '0', 'In-Portal', 'in-portal:configure_general');
+
 INSERT INTO Modules VALUES ('Core', 'core/', 'adm', DEFAULT, 1, 1, '', 0, '0');
 INSERT INTO Modules VALUES ('In-Portal', 'core/', 'm', '5.0.0', 1, 0, '', 0, '0');
\ No newline at end of file
