Index: branches/RC/core/install/install_data.sql
===================================================================
diff -u -N -r9980 -r10021
--- branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 9980)
+++ branches/RC/core/install/install_data.sql	(.../install_data.sql)	(revision 10021)
@@ -613,7 +613,6 @@
 INSERT INTO ConfigurationAdmin VALUES ('DefaultSettingsUserId', 'la_title_General', 'la_prompt_DefaultUserId', 'text', NULL, NULL, '12', '0', '0');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'DefaultSettingsUserId', -1, 'Proj-Base', 'in-portal:configure_general');
 
-UPDATE ConfigurationValues SET ModuleOwner = 'Proj-Base', Section = 'proj-base:sysconfig' WHERE VariableName IN ('UseColumnFreezer');
-UPDATE ConfigurationValues SET ModuleOwner = 'Proj-Base', Section = 'proj-base:sysconfig' WHERE VariableName IN ('TrimRequiredFields');
-UPDATE ConfigurationValues SET ModuleOwner = 'Proj-Base', Section = 'proj-base:sysconfig' WHERE VariableName IN ('MenuFrameWidth');
-UPDATE ConfigurationValues SET ModuleOwner = 'Proj-Base', Section = 'proj-base:sysconfig' WHERE VariableName IN ('DefaultSettingsUserId');
\ No newline at end of file
+INSERT INTO ConfigurationAdmin VALUES ('KeepSessionOnBrowserClose', 'la_title_General', 'la_prompt_KeepSessionOnBrowserClose', 'checkbox', NULL, NULL, '13', '0', '0');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'KeepSessionOnBrowserClose', 0, 'Proj-Base', 'in-portal:configure_general');
+
