Index: branches/RC/core/install/upgrades.sql
===================================================================
diff -u -r10024 -r10156
--- branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10024)
+++ branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10156)
@@ -167,4 +167,17 @@
 INSERT INTO ConfigurationAdmin VALUES ('KeepSessionOnBrowserClose', 'la_title_General', 'la_prompt_KeepSessionOnBrowserClose', 'checkbox', NULL, NULL, '13', '0', '0');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'KeepSessionOnBrowserClose', 0, 'Proj-Base', 'in-portal:configure_general');
 
-ALTER TABLE PersistantSessionData ADD VariableId BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY FIRST;
\ No newline at end of file
+ALTER TABLE PersistantSessionData ADD VariableId BIGINT NOT NULL AUTO_INCREMENT PRIMARY KEY FIRST;
+
+# ===== v 4.2.3 =====
+INSERT INTO ConfigurationAdmin VALUES ('u_MaxImageCount', 'la_section_ImageSettings', 'la_config_MaxImageCount', 'text', '', '', 30.01, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_ThumbnailImageWidth', 'la_section_ImageSettings', 'la_config_ThumbnailImageWidth', 'text', '', '', 30.02, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_ThumbnailImageHeight', 'la_section_ImageSettings', 'la_config_ThumbnailImageHeight', 'text', '', '', 30.03, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_FullImageWidth', 'la_section_ImageSettings', 'la_config_FullImageWidth', 'text', '', '', 30.04, 0, 0);
+INSERT INTO ConfigurationAdmin VALUES ('u_FullImageHeight', 'la_section_ImageSettings', 'la_config_FullImageHeight', 'text', '', '', 30.05, 0, 0);
+            
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_MaxImageCount', 5, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_ThumbnailImageWidth', 120, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_ThumbnailImageHeight', 120, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageWidth', 450, 'In-Portal:Users', 'in-portal:configure_users');
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'u_FullImageHeight', 450, 'In-Portal:Users', 'in-portal:configure_users');
\ No newline at end of file
