Index: branches/RC/core/install/upgrades.sql
===================================================================
diff -u -r10373 -r10399
--- branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10373)
+++ branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10399)
@@ -241,4 +241,6 @@
 INSERT INTO ConfigurationAdmin VALUES ('AutoRefreshIntervals', 'la_Text_Website', 'la_config_AutoRefreshIntervals', 'text', '', '', 10.26, 0, 0);
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AutoRefreshIntervals', '1,5,15,30,60,120,240', 'In-Portal', 'in-portal:configure_general');
 
-DELETE FROM Cache WHERE SUBSTRING(VarName, 1, 7) = 'mod_rw_';
\ No newline at end of file
+DELETE FROM Cache WHERE SUBSTRING(VarName, 1, 7) = 'mod_rw_';
+
+ALTER TABLE Category CHANGE `Status` `Status` TINYINT(4) NOT NULL DEFAULT '2';
\ No newline at end of file
