Index: branches/RC/core/install/upgrades.sql
===================================================================
diff -u -r10399 -r10420
--- branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10399)
+++ branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10420)
@@ -243,4 +243,8 @@
 
 DELETE FROM Cache WHERE SUBSTRING(VarName, 1, 7) = 'mod_rw_';
 
-ALTER TABLE Category CHANGE `Status` `Status` TINYINT(4) NOT NULL DEFAULT '2';
\ No newline at end of file
+ALTER TABLE Category CHANGE `Status` `Status` TINYINT(4) NOT NULL DEFAULT '2';
+
+# ===== v 4.3.1 =====
+INSERT INTO ConfigurationAdmin VALUES ('KeepSessionOnBrowserClose', 'la_Text_Website', 'la_config_KeepSessionOnBrowserClose', 'checkbox', '', '', 10.27, 0, 0);
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'KeepSessionOnBrowserClose', '1', 'In-Portal', 'in-portal:configure_general');
