Index: branches/RC/core/install/upgrades.sql
===================================================================
diff -u -r10667 -r10715
--- branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10667)
+++ branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 10715)
@@ -304,4 +304,7 @@
 UPDATE PortalGroup SET FrontRegistration = 1 WHERE GroupId = 13;
 
 INSERT INTO ConfigurationAdmin VALUES ('ForceImageMagickResize', 'la_Text_Website', 'la_config_ForceImageMagickResize', 'checkbox', '', '', 10.28, 0, 0);
-INSERT INTO ConfigurationValues VALUES (DEFAULT, 'ForceImageMagickResize', '0', 'In-Portal', 'in-portal:configure_general');
\ No newline at end of file
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'ForceImageMagickResize', '0', 'In-Portal', 'in-portal:configure_general');
+
+INSERT INTO ConfigurationAdmin VALUES ('AdminSSL_URL', 'la_Text_Website', 'la_config_AdminSSL_URL', 'text', '', '', 10.091, 0, 0);
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'AdminSSL_URL', '', 'In-Portal', 'in-portal:configure_general');
\ No newline at end of file
