Index: branches/RC/core/install/upgrades.sql
===================================================================
diff -u -N -r9659 -r9969
--- branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 9659)
+++ branches/RC/core/install/upgrades.sql	(.../upgrades.sql)	(revision 9969)
@@ -150,3 +150,7 @@
 REPLACE INTO ConfigurationValues VALUES (DEFAULT, 'CSVExportEnclosure', '0', 'In-Portal', 'in-portal:configure_general');
 REPLACE INTO ConfigurationValues VALUES (DEFAULT, 'CSVExportSeparator', '0', 'In-Portal', 'in-portal:configure_general');
 REPLACE INTO ConfigurationValues VALUES (DEFAULT, 'CSVExportEncoding', '0', 'In-Portal', 'in-portal:configure_general');
+
+# ===== v 4.2.2 =====
+INSERT INTO ConfigurationAdmin VALUES ('UseColumnFreezer', 'la_Text_Website', 'la_config_UseColumnFreezer', 'checkbox', '', '', 10.22, 0, 0);
+INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UseColumnFreezer', '0', 'In-Portal', 'in-portal:configure_general');
\ No newline at end of file
