Index: trunk/admin/install/upgrades/inportal_upgrade_v4.0.2.sql
===================================================================
diff -u -N -r8057 -r8066
--- trunk/admin/install/upgrades/inportal_upgrade_v4.0.2.sql	(.../inportal_upgrade_v4.0.2.sql)	(revision 8057)
+++ trunk/admin/install/upgrades/inportal_upgrade_v4.0.2.sql	(.../inportal_upgrade_v4.0.2.sql)	(revision 8066)
@@ -34,4 +34,6 @@
 
 UPDATE Phrase SET Translation = REPLACE(Translation, CHAR(146), "'");
 
+CREATE TABLE Counters (CounterId int(10) unsigned NOT NULL auto_increment,Name varchar(100) NOT NULL default '',CountQuery text,CountValue text,LastCounted int(10) unsigned default NULL,LifeTime int(10) unsigned NOT NULL default '3600',IsClone tinyint(3) unsigned NOT NULL default '0',TablesAffected text,PRIMARY KEY  (CounterId),UNIQUE KEY Name (Name));
+
 UPDATE Modules SET Version = '4.0.2' WHERE Name = 'In-Portal';
\ No newline at end of file
