Index: branches/5.0.x/in-link/install/remove_schema.sql
===================================================================
diff -u -N
--- branches/5.0.x/in-link/install/remove_schema.sql	(revision 12746)
+++ branches/5.0.x/in-link/install/remove_schema.sql	(revision 0)
@@ -1,6 +0,0 @@
-DROP TABLE Link;
-DROP TABLE LinkValidation;
-DROP TABLE Listings;
-DROP TABLE ListingTypes;
-DROP TABLE LinkCustomData;
-DROP TABLE LinkVisits;
\ No newline at end of file
