Index: branches/5.1.x/install/install_data.sql
===================================================================
diff -u -N -r13111 -r13138
--- branches/5.1.x/install/install_data.sql	(.../install_data.sql)	(revision 13111)
+++ branches/5.1.x/install/install_data.sql	(.../install_data.sql)	(revision 13138)
@@ -118,46 +118,46 @@
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'l_EnableLinkContactForm', 1, 'In-Link', 'in-link:configuration_output');
 INSERT INTO ConfigurationValues VALUES (DEFAULT, 'ReciprocalLinkChecking', '0', 'In-Link', 'in-link:configuration_output');
 
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ADD', NULL, 1, 1, NULL, 'In-Link', 'la_event_link.add', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ADD', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.add', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ADD.PENDING', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.add.pending', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ADD.PENDING', NULL, 1, 1, NULL, 'In-Link', 'la_event_link.add.pending', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.MODIFY', NULL, 1, 1, NULL, 'In-Link', 'la_event_link.modify', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.MODIFY', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.modify', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.MODIFY.PENDING', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.modify.pending', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.MODIFY.PENDING', NULL, 1, 1, NULL, 'In-Link', 'la_event_link.modify.pending', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.MODIFY.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.modify.approve', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.MODIFY.DENY', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.modify.deny', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.approve', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.DENY', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.deny', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.REVIEW.ADD', NULL, 1, 1, NULL, 'In-Link', 'la_event_link.review.add', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.REVIEW.ADD', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.review.add', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.REVIEW.ADD.PENDING', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.review.add.pending', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.REVIEW.ADD.PENDING', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.review.add.pending', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.REVIEW.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.review.approve', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.REVIEW.DENY', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.review.deny', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.APPROVE', NULL, 0, 0, NULL, 'In-Link', 'la_event_link.link.enhance.approve', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.approve', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.DENY', NULL, 0, 0, NULL, 'In-Link', 'la_event_link.link.enhance.deny', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.DENY', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.deny', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.EXPIRE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.expire', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.EXPIRE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.expire', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.EXTEND', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.extend', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.EXTEND', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.extend', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.RENEW', NULL, 0, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renew', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.RENEW', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renew', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.RENEW.FAILED', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renew_failed', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.RENEW.FAILED', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renew_failed', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.CANCEL', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renew_cancel', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.CANCEL', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renew_cancel', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.RENEWAL.NOTICE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renewal_notice', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.ENHANCE.RENEWAL.NOTICE', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.enhance.renewal_notice', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.CONTACTFORM', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.contactform', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.CONTACTFORM', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.link.contactform', 0);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.RECIPROCAL.CHECK.FAILED', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.reciprocal.check.failed', 1);
-INSERT INTO Events VALUES(DEFAULT, 'LINK.VALIDATION.RESULTS', NULL, 1, 0, NULL, 'In-Link', 'la_event_link.validation.results', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ADD', NULL, 1, 1, NULL, 'In-Link', 'Add Link', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ADD', NULL, 1, 0, NULL, 'In-Link', 'Add Link', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ADD.PENDING', NULL, 1, 0, NULL, 'In-Link', 'Add Pending Link', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ADD.PENDING', NULL, 1, 1, NULL, 'In-Link', 'Add Pending Link', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.MODIFY', NULL, 1, 1, NULL, 'In-Link', 'Modify Link', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.MODIFY', NULL, 1, 0, NULL, 'In-Link', 'Modify Link', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.MODIFY.PENDING', NULL, 1, 0, NULL, 'In-Link', 'Link Modification Pending', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.MODIFY.PENDING', NULL, 1, 1, NULL, 'In-Link', 'Link Modification Pending', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.MODIFY.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'Approve Link Modification', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.MODIFY.DENY', NULL, 1, 0, NULL, 'In-Link', 'Decline link modification', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'Approve Pending Link', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.DENY', NULL, 1, 0, NULL, 'In-Link', 'Deny Link', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.REVIEW.ADD', NULL, 1, 1, NULL, 'In-Link', 'Link Comment Added', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.REVIEW.ADD', NULL, 1, 0, NULL, 'In-Link', 'Link Comment Added', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.REVIEW.ADD.PENDING', NULL, 1, 0, NULL, 'In-Link', 'Link Comment Pending', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.REVIEW.ADD.PENDING', NULL, 1, 0, NULL, 'In-Link', 'Link Comment Pending', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.REVIEW.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'Link Comment Approved', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.REVIEW.DENY', NULL, 1, 0, NULL, 'In-Link', 'Link Comment Declined', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement submitted', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement submitted', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.APPROVE', NULL, 0, 0, NULL, 'In-Link', 'Link enhancement approved', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.APPROVE', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement approved', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.DENY', NULL, 0, 0, NULL, 'In-Link', 'Link enhancement denied', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.DENY', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement denied', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.EXPIRE', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement expired', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.EXPIRE', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement expired', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.EXTEND', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement renewal submitted', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.EXTEND', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement renewal submitted', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.RENEW', NULL, 0, 0, NULL, 'In-Link', 'Link enhancement extended', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.RENEW', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement extended', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.RENEW.FAILED', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement renewal failed', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.RENEW.FAILED', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement renewal failed', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.CANCEL', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement cancelled', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.CANCEL', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement cancelled', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.RENEWAL.NOTICE', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement is about to expire', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.ENHANCE.RENEWAL.NOTICE', NULL, 1, 0, NULL, 'In-Link', 'Link enhancement is about to expire', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.CONTACTFORM', NULL, 1, 0, NULL, 'In-Link', 'Link Contact Form', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.CONTACTFORM', NULL, 1, 0, NULL, 'In-Link', 'Link Contact Form', 0);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.RECIPROCAL.CHECK.FAILED', NULL, 1, 0, NULL, 'In-Link', 'Reciprocal Check Failed', 1);
+INSERT INTO Events (EventId, Event, ReplacementTags, Enabled, FrontEndOnly, FromUserId, Module, l1_Description, Type) VALUES(DEFAULT, 'LINK.VALIDATION.RESULTS', NULL, 1, 0, NULL, 'In-Link', 'Link Validation Results', 1);
 
 INSERT INTO CustomField VALUES (DEFAULT, 4, 'LinkAddress', 'lu_fld_LinkAddress', 0, 'la_section_BusinessLocation', 'la_fld_LinkAddress', 'text', 'size="40"', '', 1, 1, 0, 0);
 INSERT INTO CustomField VALUES (DEFAULT, 4, 'LinkCity', 'lu_fld_LinkCity', 0, 'la_section_BusinessLocation', 'la_fld_LinkCity', 'text', 'size="40"', '', 2, 1, 0, 0);
